4.25 x 5.5 inch
handbill template
Bleed area: 4.5 x 5.75 inches
(green background) Extend background image to fill this area.
It ensures you don’t have white edges once we cut
Trim area: 4.25 x 5.5 inches
(dashed line) This is where we will cut your handbill
Safe area: 4 x 5.25 inches
(solid line) This is as far as any important info should
extend like text or logos